-- key-value store, will be used for various one-off values, serialized to bytes
CREATE TABLE kv (
    name TEXT PRIMARY KEY,
    value BLOB
);

-- config is currently stored in its own table, as text
INSERT INTO kv (name, value)
SELECT 'config', CAST(data AS BLOB) FROM config;

DROP TABLE config;
