<script>
    import Nav from '../ui/Nav.svelte';
    import Link from '../ui/Link.svelte';
</script>


<Nav />

<div class="mx-auto mt-3 max-w-md">
    <h2 class="text-2xl font-bold text-center">Settings</h2>

    <div class="divider"></div>
    <div class="grid grid-cols-2 items-center">
        <h3 class="text-lg font-bold">Start minimized</h3>
        <input type="checkbox" class="justify-self-end toggle toggle-success" />
    </div>
    <p class="mt-3">Minimize to the system tray at startup.</p>

    <div class="divider"></div>
    <div class="grid grid-cols-2 items-center">
        <h3 class="text-lg font-bold">Re-hide delay</h3>
        <div class="justify-self-end">
            <span class="mr-2">(Seconds)</span>
            <input type="text" class="input input-sm input-bordered text-right max-w-[4rem]" />
        </div>
    </div>
    <p class="mt-3">
        How long to wait after a request is approved/denied before minimizing
        the window to tray. Only applicable if the window was minimized
        to tray before the request was received.
    </p>

    <div class="divider"></div>
    <div class="grid grid-cols-2 items-center">
        <h3 class="text-lg font-bold">Update credentials</h3>
        <div class="justify-self-end">
            <Link target="EnterCredentials">
                <button class="btn btn-sm btn-primary">Update</button>
            </Link>
        </div>
    </div>
    <p class="mt-3">Update or re-enter your encrypted credentials.</p>

</div>
